/*
 Navicat Premium Data Transfer

 Source Server         : 127.0.0.1
 Source Server Type    : MySQL
 Source Server Version : 80011
 Source Host           : localhost:3306
 Source Schema         : competition_db

 Target Server Type    : MySQL
 Target Server Version : 80011
 File Encoding         : 65001

 Date: 29/11/2024 15:24:07
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for uplaod_file
-- ----------------------------
DROP TABLE IF EXISTS `uplaod_file`;
CREATE TABLE `uplaod_file`  (
  `FileId` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '文件Id',
  `FileName` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '文件名称',
  `FilePath` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '文件路径',
  PRIMARY KEY (`FileId`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of uplaod_file
-- ----------------------------
INSERT INTO `uplaod_file` VALUES ('c07ad05792174b229cf8af1c849b1fdd', '安全合规性照片（全身照）', '~/UploadFile/c07ad05792174b229cf8af1c849b1fdd001.jpg');

SET FOREIGN_KEY_CHECKS = 1;
