-- ----------------------------
-- 视频流检测表增加监理复核相关字段
-- ----------------------------
ALTER TABLE `cons_video_detection`
ADD COLUMN `review_status` char(1) DEFAULT '0' COMMENT '复核状态：0待复核 1合格 2不合格' AFTER `img_url`,
ADD COLUMN `review_by` varchar(64) DEFAULT NULL COMMENT '复核人' AFTER `review_status`,
ADD COLUMN `review_time` datetime DEFAULT NULL COMMENT '复核时间' AFTER `review_by`;
